Uchwała Nr XXV/131/16
Rady Gminy Głowno

z dnia 14 listopada 2016 r.

w sprawie wyrażenia zgody na zawarcie porozumienia dotyczącego powierzenia Gminie Zgierz wykonywania zadania publicznego.

Na podstawie art. 18 ust.2 pkt 12 i art. 74 ust.1 ustawy z dnia 8 marca 1990 roku o samorządzie gminnym (Dz.U.2016.446 j.t.) oraz art. 3 ust. 2 pkt 2 z dnia 7 czerwca 200l roku o zbiorowym zaopatrzeniu w wodę i zbiorowym odprowadzaniu ścieków (Dz.U.2015.139 j.t.; zm. 2015.1893, 2016.1250) uchwala się, co następuje:

§ 1. Wyraża się zgodę na zawarcie porozumienia z Gminą Zgierz  dotyczącego powierzenia Gminie Zgierz wykonywania zadania publicznego polegającego na zaopatrzeniu mieszkańców wsi Feliksów w wodę do celów socjalno-bytowych i przeciwpożarowych z sieci wodociągowej Gminy Zgierz.

§ 2. Upoważnia się Wójta Gminy do podpisania porozumienia z Gminą Zgierz.

§ 3. Wykonanie uchwały powierza się Wójtowi Gminy Głowno.

§ 4. Uchwała wchodzi w życie z dniem podjęcia i podlega ogłoszeniu.  

Przewodniczący Rady Gminy Głowno

Łukasz Łukasik