Uchwała Nr XXVIII/149/17
Rady Gminy Głowno

z dnia 31 stycznia 2017 r.

w sprawie przedłużenia czasu obowiązywania taryf za wodę dostarczaną z urządzeń zbiorowego zaopatrzenia w wodę na terenie gminy Głowno.

Na podstawie art. 18 ust. 2 pkt. 15 ustawy z dnia 8 marca 1990 r. o samorządzie gminnym (Dz.U.2016.446 j.t.; zm. poz. 1579 i 1948) oraz art. 24 ust. 9a ustawy z dnia 7 czerwca 2001 r. o zbiorowym  zaopatrzeniu w wodę i zbiorowym odprowadzaniu ścieków (tekst jednolity: Dz. U. z 2015 r. poz. 139 i poz. 1893, z 2016 r. poz. 1250) Rada Gminy Głowno uchwala, co następuje:

§ 1. Przedłuża się na okres 1 roku tj. od dnia 01.02.2017 r. do dnia 31.01.2018 r. czas obowiązywania dotychczasowych taryf za wodę w gminie Głowno, dostarczaną z urządzeń zbiorowego zaopatrzenia w wodę.

§ 2. Wykonanie uchwały powierza się Wójtowi Gminy Głowno.

§ 3. Uchwała wchodzi w życie z dniem podjęcia i podlega ogłoszeniu. 

Przewodniczący Rady Gminy Głowno

Łukasz Łukasik