Uchwała Nr XXIX/151/17
Rady Gminy Głowno

z dnia 30 marca 2017 r.

w sprawie funduszu sołeckiego na rok budżetowy 2018.

Na podstawie art. 18 ust. 2 pkt 15 ustawy z dnia 8 marca 1990 r. o samorządzie gminnym (Dz.U.2016.446 j.t.; zm. poz. 1579, poz. 1948) oraz art. 2 ust. 1 ustawy z dnia 21 lutego 2014 r. o funduszu sołeckim (Dz.U.2014.301) uchwala się, co następuje:

§ 1. Nie wyraża się zgody na wyodrębnienie funduszu sołeckiego w budżecie Gminy Głowno na rok 2018.

§ 2. Wykonanie uchwały powierza się Wójtowi Gminy Głowno.

§ 3. Uchwała wchodzi w życie z dniem podjęcia i podlega ogłoszeniu.

Przewodniczący Rady Gminy Głowno

Łukasz Łukasik