Uchwała Nr XXXI/175/17
Rady Gminy Głowno

z dnia 31 maja 2017 r.

zmieniająca uchwałę w sprawie powołania Komisji ds Koordynacji Prac Organów Rady Gminy.

Na podstawie art. 21 ust. 1 ustawy z dnia 8 marca 1990 r. o samorządzie gminnym (Dz.U.2016.446 j.t.; zm. 1579, 1948; z 2017 r. poz. 730) oraz § 77 ust. 3 Statutu Gminy Głowno (j.t. Dz. Urz. Województwa Łódzkiego z 2016 r. poz. 5222) uchwala się, co następuje:

§ 1. Zmienia się brzmienie § 1 uchwały Nr II/9/14 Rady Gminy Głowno z dnia 10 grudnia 2014 r. w sprawie powołania Komisji ds Koordynacji Prac Organów Rady Gminy Głowno w sposób następujący: § 1. Powołuje się Komisję ds Koordynacji Prac Organów Rady Gminy w składzie:

1) Przewodniczący - Łukasz Łukasik;

2) Członek - Eligiusz Dąbek;

3) Członek - Mieczysław Dałek;

4) Członek - Beata Soczyńska;

5) Członek - Władysław Mikołajczyk;

6) Członek - Jarosław Chałubiec;

7) Członek - Jolanta Deka.

§ 2. Uchwała wchodzi w życie z dniem podjęcia i podlega ogłoszeniu.  

Przewodniczący Rady  Gminy Głowno

Łukasz Łukasik